S3 伽瑪說明

要學習如何使用說明，請按 F1.   著作權


栓槽顯示是紅、綠、和藍色伽瑪栓槽被顯示出來的地方。這些是會大概顯示出伽瑪將會如何被調整的曲線。一般而言，從一個角到另一個角的直線表示1.00的伽瑪，或不需調整。超過45度的彎曲曲線表示伽瑪已經被調整過了，所以（栓槽的）的顏色會比正常的顏色更亮。45度線以下的彎曲表示被調整的顏色會比一般的顏色暗。


移動紅色的滑動調整器來調整紅色組件的伽瑪值。越往右邊移動此調整器，伽瑪值就越高，紅色就會越亮。越往左邊移動此調整器，伽瑪值就越低，紅色就會越暗。


要變更紅色組件的伽瑪調整值，您可以在這個區域輸入0.20到3.00的值。值越高，紅色就會越亮，值越低，紅色就會越暗。


移動綠色的滑動調整器來調整綠色組件的伽瑪值。越往右邊移動此調整器，伽瑪值就越高，綠色就會越亮。越往左邊移動此調整器，伽瑪值就越低，綠色就會越暗。


要變更綠色組件的伽瑪調整值，您可以在這個區域輸入0.20到3.00的值。值越高，綠色就會越亮，值越低，綠色就會越暗。


移動藍色的滑動調整器來調整藍色組件的伽瑪值。越往右邊移動此調整器，伽瑪值就越高，藍色就會越亮。越往左邊移動此調整器，伽瑪值就越低，藍色就會越暗。


要變更藍色組件的伽瑪調整值，您可以在這個區域輸入0.20到3.00的值。值越高，藍色就會越亮，值越低，藍色就會越暗。


這個核取方塊決定紅、綠、和藍色伽瑪調整值是否互相連結在一起。如果這個方塊被核取，伽瑪組件便是連結在一起，表示這三個伽瑪值永遠都會是一樣的。如果這個方塊沒有被核取，那麼每個伽瑪調整值便可以被個別變更。


這個按鈕可以儲存所有達1.00的伽瑪調整值，並在「已連結」核取方塊放置一個核取記號。這是預設值，在這裡，沒有任何伽瑪調整值被套用到您的影像輸出。


按一下這裡來儲存您的目前伽瑪設定值。您所輸入的名稱會出現在設計方式清單，所以您可以很容易地選擇此名稱來還原您的設定值。


刪除「設計方式」方塊中選取的設計方式。


S3 伽瑪是可以讓您從S3圖形晶片調整輸出伽瑪的公用程式。簡單而言，調整伽瑪就等於是調整亮度。


列出您可以用來變更已套用於您系統中的伽瑪調整值的設計方式。設計方式可以儲存紅、綠、和藍色、以及三個組件是否連結在一起的伽瑪調整值。


提供一個您可以鍵入目前伽瑪設定值的地方。您所鍵入的名稱會出現「設計方式」清單，因此，稍後您可以很容易地還原這三個設定值。


選取這一項，將設定套用至顯示器 1。


選取這一項，將設定套用至顯示器 2。


著作權注意事項

S3, S3 On Board, 和 Trio3D 是 S3 公司的商標。.