VERSION 1.0 CLASS
BEGIN
  MultiUse = -1  'True
END
Attribute VB_Name = "CSCommon"
Attribute VB_GlobalNameSpace = False
Attribute VB_Creatable = True
Attribute VB_PredeclaredId = False
Attribute VB_Exposed = False
Option Explicit

Public DppConfig As New clsDppConfig

Public profile As New clsProfile
Public HwCfgDP5 As String
Public cstrRawCfgIn As String
Public HwCfgReady As Boolean
Public HwCfgExReady As Boolean
Public Dp5CmdList As New Collection
Public HwCfgDP5Out As String
Public HwRdBkDP5Out As String

Public SCAEnabled As Boolean
Public HwScaCfgDP5 As String
Public cstrRawScaCfgIn As String
Public HwScaCfgReady As Boolean

' Shared Communications Interface Settings
Public CurrentInterface As Byte         ' selected communications interface (0=RS232/1=USB/2=ETHERNET)
Public isDppConnected As Boolean        ' CurrentInterface selected and device found
Public ComPort As Long                  ' Serial Port Settings

' Ethernet Settings
Public NetfinderActive As Boolean
Public SockAddr As Long
Public cstrSockAddr As String
Public InetPort As Long

